Converging sequences in metric space have Hausdorff dimension zero,
but their metric dimension (limit capacity, entropy dimension,
box-counting dimension, respectively) can be positive. Dimensions of
such sequences are calculated using a different approach for each
type.

A rather simple formula for (lower, upper) metric dimension of any
sequence given by a differentiable convex function, is derived in this
paper.


